========                                            NOSview [137]
INFO.HLP
========

Welcome to NS9BOB's TCP/IP system

The system here is composed of:

       Computer:  IBM-PC (4.77MHz), 15MB disk, 640K
Radio Interface:  Paccomm PC-100, on 145.01
                  (interface name "s01")
Radio Interface:  MFJ-1270, on 145.11
                  (interface name "r11")

Please leave mail for me using the command:

       s ns9bob

73
